positron PH /PMT/gamma/positron

ReactorFsim PMT data: reactor neutrinos

1 10 10^2

10^3

10^4

10^5

10^6

10^7

0 0.02 0.04 0.06 0.08 0.1

ID Entries Mean RMS

102 52231905 0.6924E-03 0.1935E-02

2005/02/21 14.08 events neutron PH /PMT/gamma/neutron 10 10^2

10^3

10^4

10^5

10^6

0 0.02 0.04 0.06 0.08 0.1

ID Entries Mean RMS

103 9871730 0.2673E-02 0.5536E-02

positron time /PMT/gamma/positron

10^2

10^3

10^4

10^5

10^6

0 10 20 30 40 50

ID Entries Mean RMS

202 52231905 20.81 5.490

events neutron time /PMT/gamma/neutron 10 10^2

10^3

10^4

10^5

0 2000 4000 x 10^2

ID Entries Mean RMS

203 9871730 0.4246E+05 0.4737E+05

number of gamma/positron

ReactorFsim positron data: reactor neutrinos

1

10

10^2

10^3

0 10 20 30

ID Entries Mean RMS

302 10000 12.64 4.128

2005/02/21 14.08 events positron gamma energy

10 10^2

10^3

10^4

10^5

0 2 4 6 8 10

ID Entries Mean RMS

402 121358 0.2798 0.7484

positron gamma time

10^2

10^3

0 1 2 3 4 5

ID Entries Mean RMS

502 121358 1.564 1.162

positron gamma radius 1

10

10^2

10^3

0 100 200 300 400

ID Entries Mean RMS

602 121358 254.3 70.69

number of gamma/neutron

ReactorFsim neutron data: reactor neutrinos

1

10

10^2

10^3

10^4

0 5 10 15 20

ID Entries Mean RMS

303 10000 2.206 1.114

2005/02/21 14.08 events neutron gamma energy 1 10 10^2

10^3

10^4

0 2 4 6 8 10

ID Entries Mean RMS

403 17058 2.541 1.398

neutron gamma time 1

10

10^2

10^3

0 2000 4000 x 10^2

ID Entries Mean RMS

503 17058 0.7693E+05 0.9619E+05

neutron gamma radius 1

10

10^2

0 100 200 300 400

ID Entries Mean RMS

603 17058 236.7 71.72

wtf

ReactorFsim ntuples: reactor events

10

10^2

10^3

0 0.1 0.2

ID Entries Mean RMS

1000000 10000 0.4947E-01 0.4604E-01

2005/02/21 14.08 events enu 10

10^2

2 4 6 8

ID Entries Mean RMS

1000000 10000 4.257 1.301

(MeV)

vnu1r 1

10

10^2

0 100 200 300 400

ID Entries Mean RMS

1000000 10000 262.0 68.07

(cm) events

-1 -0.75

-0.5

-0.25 0 0.25 0.5 0.75 1

0 2 4 6

vnu1cos VS. vnu1phi(deg) kepos1

ReactorFsim ntuples: reactor events

10

10^2

0 2 4 6

ID Entries Mean RMS

1000000 10000 2.437 1.290

2005/02/21 14.08

(MeV) events vpos1r 1

10

10^2

0 100 200 300 400

ID Entries Mean RMS

1000000 10000 262.0 68.10

(cm)

sqrt((vnu1x-vpos1x)**2+(vnu1y-vpos1y)**2+(vnu1z-vpos1z)**2) 1

10

10^2

0 1 2 3 4

ID Entries Mean RMS

1000000 10000 1.606 0.9414

(cm) events tpos1 1

10

10^2

0 0.05 0.1 0.15

ID Entries Mean RMS

1000000 10000 0.5855E-01 0.3223E-01

(nsec) keneu1

ReactorFsim ntuples: reactor events

1

10

10^2

10^3

0 0.025 0.05 0.075 0.1

ID Entries Mean RMS

1000000 10000 0.1634E-01 0.1555E-01

2005/02/21 14.08

(MeV) events vneu1r 1

10

10^2

0 100 200 300 400

ID Entries Mean RMS

1000000 10000 262.3 68.58

(cm)

sqrt((vnu1x-vneu1x)**2+(vnu1y-vneu1y)**2+(vnu1z-vneu1z)**2) 1

10

10^2

10^3

0 20 40 60

ID Entries Mean RMS

1000000 10000 9.052 5.897

(cm) events tneu1 1 10 10^2

10^3

0 1000 2000 x 10^3

ID Entries Mean RMS

1000000 10000 0.1376E+06 0.1779E+06

(nsec) phposrec

ReactorFsim ntuples: reactor events

1 10 10^2

10^3

0 2 4 6 8

ID Entries Mean RMS

1000000 10000 1.556 1.851

2005/02/21 14.08

(MeV) events phneurec 1

10

10^2

10^3

10^4

0 5 10

ID Entries Mean RMS

1000000 10000 2.981 3.751

(MeV)

(tneu1-tpos1)/1000. 1 10 10^2

10^3

0 1000 2000

ID Entries Mean RMS

1000000 10000 137.6 177.9

(μsec) events ngampos 1

10

10^2

10^3

0 10 20 30

ID Entries Mean RMS

1000000 10000 12.39 4.128